<script lang="ts">
    // import { delay } from "octagonal-wheels/promises";
    import DialogHeader from "@/modules/services/LiveSyncUI/components/DialogHeader.svelte";
    import Guidance from "@/modules/services/LiveSyncUI/components/Guidance.svelte";
    import Decision from "@/modules/services/LiveSyncUI/components/Decision.svelte";
    import UserDecisions from "@/modules/services/LiveSyncUI/components/UserDecisions.svelte";
    import InfoNote from "@/modules/services/LiveSyncUI/components/InfoNote.svelte";
    import InputRow from "@/modules/services/LiveSyncUI/components/InputRow.svelte";
    import Password from "@/modules/services/LiveSyncUI/components/Password.svelte";
    import { PouchDB } from "@vrtmrz/livesync-commonlib/compat/pouchdb/pouchdb-browser";
    import {
        DEFAULT_SETTINGS,
        P2P_DEFAULT_SETTINGS,
        P2PConnectionPaths,
        P2PMessageSizePresets,
        PREFERRED_BASE,
        RemoteTypes,
        hasValidP2PTurnServerUrl,
        normaliseP2PConnectionPath,
        normaliseP2PMaxWirePayloadBytes,
        type EntryDoc,
        type ObsidianLiveSyncSettings,
        type P2PConnectionInfo,
        type P2PSyncSetting,
    } from "@vrtmrz/livesync-commonlib/compat/common/types";

    import { TrysteroReplicator } from "@vrtmrz/livesync-commonlib/compat/replication/trystero/TrysteroReplicator";
    import type { ReplicatorHostEnv } from "@vrtmrz/livesync-commonlib/compat/replication/trystero/types";
    import {
        copyTo,
        generateP2PRoomId,
        pickP2PSyncSettings,
        type SimpleStore,
    } from "@vrtmrz/livesync-commonlib/compat/common/utils";
    import { onMount } from "svelte";
    import { getDialogContext, type GuestDialogProps } from "@/modules/services/LiveSyncUI/svelteDialog";
    import { SETTING_KEY_P2P_DEVICE_NAME } from "@vrtmrz/livesync-commonlib/compat/common/types";
    import ExtraItems from "@/modules/services/LiveSyncUI/components/ExtraItems.svelte";
    import { TYPE_CANCELLED, type SetupRemoteP2PResultType } from "./setupDialogTypes";
    import { LOG_LEVEL_VERBOSE, Logger } from "octagonal-wheels/common/logger";
    import { $msg as translateMessage } from "@/common/translation";
    import { probeP2PSetupConnection } from "./p2pSetupConnectionProbe";

    const default_setting = pickP2PSyncSettings(DEFAULT_SETTINGS);
    let syncSetting = $state<P2PConnectionInfo>({ ...default_setting });

    const context = getDialogContext();
    let error = $state("");
    let connectionPathResetNotice = $state(false);
    const hasValidTurnServer = $derived(hasValidP2PTurnServerUrl(syncSetting.P2P_turnServers ?? ""));
    type Props = GuestDialogProps<SetupRemoteP2PResultType, P2PSyncSetting>;

    const { setResult, getInitialData }: Props = $props();
    onMount(() => {
        let initialData: P2PSyncSetting | undefined = undefined;
        if (getInitialData) {
            initialData = getInitialData();
            if (initialData) {
                copyTo(initialData, syncSetting);
            }
        }
        const initialPeerName = (initialData?.P2P_DevicePeerName ?? "").trim();
        if (initialPeerName !== "") {
            return;
        }
        const cachedPeerName = context.services.config.getSmallConfig(SETTING_KEY_P2P_DEVICE_NAME);
        if (cachedPeerName) {
            syncSetting.P2P_DevicePeerName = cachedPeerName as string;
        }
    });
    function generateSetting() {
        const connSetting: P2PSyncSetting = {
            // remoteType: ",
            ...P2P_DEFAULT_SETTINGS,
            ...syncSetting,
            P2P_Enabled: true,
            P2P_maxWirePayloadBytes: normaliseP2PMaxWirePayloadBytes(syncSetting.P2P_maxWirePayloadBytes),
            P2P_connectionPath:
                normaliseP2PConnectionPath(syncSetting.P2P_connectionPath) === P2PConnectionPaths.Relay &&
                hasValidTurnServer
                    ? P2PConnectionPaths.Relay
                    : P2PConnectionPaths.Automatic,
        };
        const trialSettings: P2PSyncSetting = {
            ...connSetting,
        };
        const trialRemoteSetting: ObsidianLiveSyncSettings = {
            ...DEFAULT_SETTINGS,
            ...PREFERRED_BASE,
            remoteType: RemoteTypes.REMOTE_P2P,
            ...trialSettings,
        };
        return trialRemoteSetting;
    }

    async function checkConnection() {
        try {
            processing = true;
            const trialRemoteSetting = generateSetting();
            const map = new Map<string, string>();
            const store = {
                get: (key: string) => {
                    return Promise.resolve(map.get(key) || null);
                },
                set: (key: string, value: any) => {
                    map.set(key, value);
                    return Promise.resolve();
                },
                delete: (key: string) => {
                    map.delete(key);
                    return Promise.resolve();
                },
                keys: () => {
                    return Promise.resolve(Array.from(map.keys()));
                },
                get db() {
                    return Promise.resolve(this);
                },
            } as SimpleStore<any>;

            const dummyPouch = new PouchDB<EntryDoc>("dummy");
            const env: ReplicatorHostEnv = {
                events: context.context.events,
                translate: context.context.translate,
                settings: trialRemoteSetting,
                processReplicatedDocs: async (_docs: any[]) => {
                    return;
                },
                confirm: context.services.confirm,
                db: dummyPouch,
                simpleStore: store,
                deviceName: syncSetting.P2P_DevicePeerName || "unnamed-device",
                platform: "setup-wizard",
            };
            const replicator = new TrysteroReplicator(env);
            try {
                const result = await probeP2PSetupConnection(replicator);
                if (!result.ok) {
                    return translateMessage("Failed to connect to the signalling relay: ${reason}", {
                        reason: `${result.reason}`,
                    });
                }
                return "";
            } finally {
                try {
                    await replicator.close();
                    await dummyPouch.destroy();
                } catch (e) {
                    Logger(e, LOG_LEVEL_VERBOSE, "setup-p2p-cleanup");
                }
            }
        } finally {
            processing = false;
        }
    }
    function setDefaultRelay() {
        syncSetting.P2P_relays = P2P_DEFAULT_SETTINGS.P2P_relays;
    }

    $effect(() => {
        if (!hasValidTurnServer && syncSetting.P2P_connectionPath === P2PConnectionPaths.Relay) {
            syncSetting.P2P_connectionPath = P2PConnectionPaths.Automatic;
            connectionPathResetNotice = true;
        }
    });

    let processing = $state(false);
    function generateDefaultGroupId() {
        syncSetting.P2P_roomID = generateP2PRoomId();
    }

    async function checkAndCommit() {
        error = "";
        try {
            error = (await checkConnection()) || "";
            if (!error) {
                const setting = generateSetting();
                setResult(pickP2PSyncSettings(setting));
                return;
            }
        } catch (e) {
            error = translateMessage("Error during connection test: ${reason}", { reason: `${e}` });
            return;
        }
    }
    function commit() {
        const setting = pickP2PSyncSettings(generateSetting());
        setResult(setting);
    }
    function cancel() {
        setResult(TYPE_CANCELLED);
    }
    const canProceed = $derived.by(() => {
        return (
            syncSetting.P2P_relays.trim() !== "" &&
            syncSetting.P2P_roomID.trim() !== "" &&
            syncSetting.P2P_passphrase.trim() !== "" &&
            (syncSetting.P2P_DevicePeerName ?? "").trim() !== ""
        );
    });
</script>

<DialogHeader title={translateMessage("P2P Configuration")} />
<Guidance>{translateMessage("Please enter the Peer-to-Peer Synchronisation information below.")}</Guidance>
<InputRow label={translateMessage("Enabled")}>
    <input type="checkbox" name="p2p-enabled" bind:checked={syncSetting.P2P_Enabled} />
</InputRow>
<InputRow label={translateMessage("Signalling relay URLs")}>
    <input
        type="text"
        name="p2p-relay-url"
        placeholder="wss://relay.example.com"
        autocorrect="off"
        autocapitalize="off"
        spellcheck="false"
        bind:value={syncSetting.P2P_relays}
    />
    <button class="button" onclick={() => setDefaultRelay()}>
        {translateMessage("Use the project's public signalling relay")}
    </button>
</InputRow>
<InfoNote>
    {translateMessage("Peer discovery uses Nostr-compatible signalling relays.")}
    {translateMessage(
        "The project's public signalling relay is a best-effort convenience operated by the project author. It does not store Vault contents, but signalling metadata may be visible to the relay. Availability and log retention are not guaranteed. You can replace it with your own Nostr-compatible relay."
    )}
    <a
        href="https://github.com/vrtmrz/obsidian-livesync/blob/main/docs/p2p.md"
        target="_blank"
        rel="noopener noreferrer">{translateMessage("Learn more about P2P connections")}</a
    >.
</InfoNote>
<InputRow label={translateMessage("Group ID")}>
    <input
        type="text"
        name="p2p-room-id"
        placeholder="123-456-789-abc"
        autocorrect="off"
        autocapitalize="off"
        spellcheck="false"
        bind:value={syncSetting.P2P_roomID}
    />
    <button class="button" onclick={() => generateDefaultGroupId()}>{translateMessage("Generate Random ID")}</button>
</InputRow>
<InputRow label={translateMessage("Passphrase")}>
    <Password
        name="p2p-password"
        placeholder={translateMessage("Enter your passphrase")}
        bind:value={syncSetting.P2P_passphrase}
    />
</InputRow>
<InfoNote>
    {translateMessage(
        "The Group ID and passphrase are used to identify your group of devices. Make sure to use the same Group ID and passphrase on all devices you want to synchronise."
    )}<br />
    {translateMessage(
        "Note that the Group ID is not limited to the generated format; you can use any string as the Group ID."
    )}
</InfoNote>
<InputRow label={translateMessage("Device Peer ID")}>
    <input
        type="text"
        name="p2p-device-peer-id"
        placeholder="main-iphone16"
        autocorrect="off"
        autocapitalize="off"
        spellcheck="false"
        bind:value={syncSetting.P2P_DevicePeerName}
    />
</InputRow>
<InputRow label={translateMessage("Auto Start P2P Connection")}>
    <input type="checkbox" name="p2p-auto-start" bind:checked={syncSetting.P2P_AutoStart} />
</InputRow>
<InfoNote>
    {translateMessage(
        'If "Auto Start P2P Connection" is enabled, the P2P connection will be started automatically when the plug-in launches.'
    )}
</InfoNote>
<InputRow label={translateMessage("Announce changes automatically after connecting")}>
    <input type="checkbox" name="p2p-auto-broadcast" bind:checked={syncSetting.P2P_AutoBroadcast} />
</InputRow>
<InfoNote>
    {translateMessage(
        "When enabled, this device notifies connected peers after a local change. The notification contains no Vault data; a peer which follows this device then fetches the change through the encrypted P2P connection."
    )}
</InfoNote>
<ExtraItems title={translateMessage("Connection compatibility")}>
    <InputRow label={translateMessage("P2P message size")}>
        <select
            name="p2p-message-size"
            aria-label={translateMessage("P2P message size")}
            bind:value={syncSetting.P2P_maxWirePayloadBytes}
        >
            <option value={P2PMessageSizePresets.Standard}>{translateMessage("Standard")}</option>
            <option value={P2PMessageSizePresets.Reduced}>{translateMessage("Reduced")}</option>
            <option value={P2PMessageSizePresets.Conservative}>{translateMessage("Conservative")}</option>
            <option value={P2PMessageSizePresets.MaximumCompatibility}
                >{translateMessage("Maximum compatibility")}</option
            >
        </select>
    </InputRow>
    <InfoNote>
        {translateMessage(
            "Smaller messages can improve compatibility on paths which fragment or drop larger WebRTC messages. This setting limits outgoing P2P messages, so use a compatible profile on each sending device when required."
        )}
    </InfoNote>
    <InputRow label={translateMessage("Connection path")}>
        <select
            name="p2p-connection-path"
            aria-label={translateMessage("Connection path")}
            bind:value={syncSetting.P2P_connectionPath}
            onchange={() => (connectionPathResetNotice = false)}
        >
            <option value={P2PConnectionPaths.Automatic}>{translateMessage("Automatic")}</option>
            <option value={P2PConnectionPaths.Relay} disabled={!hasValidTurnServer}
                >{translateMessage("TURN relay only")}</option
            >
        </select>
    </InputRow>
    <InfoNote>
        {translateMessage(
            "TURN relay only is available when at least one valid TURN server URL is configured under Advanced Settings."
        )}
    </InfoNote>
    <InfoNote notice visible={connectionPathResetNotice}>
        {translateMessage(
            "TURN relay only requires at least one valid TURN server URL. Connection path has been restored to Automatic."
        )}
    </InfoNote>
</ExtraItems>
<ExtraItems title={translateMessage("Advanced Settings")}>
    <InfoNote>
        {translateMessage(
            "TURN server settings are only necessary if you are behind a strict NAT or firewall that prevents direct P2P connections. In most cases, you can leave these fields blank."
        )}
    </InfoNote>
    <InfoNote warning>
        {translateMessage(
            "TURN relays the encrypted WebRTC connection only when a direct path cannot be established. A TURN provider cannot read encrypted Vault contents, but it can observe connection metadata and traffic volume. Use a provider you trust."
        )}
        <a
            href="https://github.com/vrtmrz/obsidian-livesync/blob/main/docs/p2p.md#signalling-relay-and-turn-server"
            target="_blank"
            rel="noopener noreferrer">{translateMessage("Learn more about signalling and TURN")}</a
        >.
    </InfoNote>
    <InputRow label={translateMessage("TURN Server URLs (comma-separated)")}>
        <textarea
            name="p2p-turn-servers"
            placeholder="turn:turn.example.com:3478,turn:turn.example.com:443"
            autocapitalize="off"
            spellcheck="false"
            bind:value={syncSetting.P2P_turnServers}
            rows="5"
        ></textarea>
    </InputRow>
    <InputRow label={translateMessage("TURN Username")}>
        <input
            type="text"
            name="p2p-turn-username"
            placeholder={translateMessage("Enter TURN username")}
            autocorrect="off"
            autocapitalize="off"
            spellcheck="false"
            bind:value={syncSetting.P2P_turnUsername}
        />
    </InputRow>
    <InputRow label={translateMessage("TURN Credential")}>
        <Password
            name="p2p-turn-credential"
            placeholder={translateMessage("Enter TURN credential")}
            bind:value={syncSetting.P2P_turnCredential}
        />
    </InputRow>
</ExtraItems>
<InfoNote error visible={error !== ""}>
    {error}
</InfoNote>
{#if processing}
    {translateMessage("Checking connection... Please wait.")}
{:else}
    <UserDecisions>
        <Decision
            title={translateMessage("Test Settings and Continue")}
            important
            disabled={!canProceed}
            commit={() => checkAndCommit()}
        />
        <Decision title={translateMessage("Continue anyway")} commit={() => commit()} />
        <Decision title={translateMessage("Cancel")} commit={() => cancel()} />
    </UserDecisions>
{/if}
