insert into ttrss_prefs (pref_name,type_id,def_value,short_desc,section_id) values('_PREFS_ACTIVE_TAB', 2, '', '', 1);

insert into ttrss_prefs (pref_name,type_id,def_value,short_desc,section_id) values('_INFOBOX_DISABLE_OVERLAY', 1, 'false', '', 1);

update ttrss_version set schema_version = 17;
